MIDAS version: 98NOV

Fr, 25 Feb 2000 23:30:39

Frame : a2142_hons4.bdf Identifier : ITT-table : log.itt LUT-table : rainbow3 Coordinates : -1891, 1919 : 1919, -1891 Pixels : 1, 1 : 512, 512 Cut values : 0, 0.005 User : ugb

ESO-MIDAS(98NOV); Fr, 25 Feb 2000 23:30:39

-1891 1919

1919

-1891